cms ly 5- 4- 3- 2- 1- 0 1 2 3 4

Data/theory

0.8 0.9 1 1.1 1.2 1.3 1.4 pQCD+CT10+EPS09 >10 GeV/c) μ T ALICE (p

>25 GeV/c) l T CMS (p

)^- W

← ^-(lσ

= 5.02 TeV, NNs p-Pb